50 75 100 125 150 175 200 -1 0 1 2 3 4 5 6 7

T22 - T2 (K)

Brightness Temperature (°C) -101 -82 -68 -56 -46 -37 -29

50 75 100 125 150 175 200 0 20 40

Downward IR Flux (W m^{-2} )

Number (thousands)