50 75 100 125 150 175 200 -80 -75 -70 -65 -60 -55 -50 -45 -40 -35 -30 Brightness Temperature (°C) -101 -82 -68 -56 -46 -37 -29

T2 (°C)

50 75 100 125 150 175 200 0 20 40

Downward IR Flux (W m^{-2} )

Number (thousands)