-65

-60

-55

-50

-45

-40

-35

-30

Month

Mean Temperature ( °C)

2

3

4

5

6

7

8

9

10

Standard Deviation (K)

Jan Feb Mar Apr May Jun Jul Aug Sep Oct Nov Dec