0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 -67 -66 -65 -64 -63 -62 -61 -60 -59 -58 -57 -56 -55 -54 -53 -52 -51 -50 -49 -48 -47 -46 -45

Hour

Temperature ( °C)

88 96 104 112 120 128 136 144 152 160 168 176 184

Downward IR Flux (W m -2)

Calculated surface temperature Calculated surface temperature with sensible heat Measured downward longwave flux Measured air temperature at 2 m