0 200 400 600 800 1000

Altitude (m above surface)

0 200 400 600 800 1000

0 200 400 600 800 1000

-70 -60 -50 -40 -30 0 200 400 600 800 1000

Temperature (°C)

-70 -60 -50 -40 -30 Temperature (°C)

-70 -60 -50 -40 -30 -20 Temperature (°C)

Jan Feb Mar

Apr May Jun

Jul Aug Sep

Oct Nov Dec