-1 0 1 2 3 4 0 5 10 15 20 25 30 35

T(2 m) - T(surface) (K)

Relative Frequency (%)

-1 0 1 2 3 4 0 5 10 15 20 25 30 35

T(2 m) - T(surface) (K)

(a) All Sky

(b) Clear Sky

N = 7752

N = 3876