0 30 60 90 120 150 180 210 240 270 300 330 -70 -60 -50 -40 -30

Median T 2 (°C)

0 30 60 90 120 150 180 210 240 270 300 330 0 1 2 3 4

Median δT (K)

0 30 60 90 120 150 180 210 240 270 300 330 0

5

10

Wind direction (degrees)

Frequency (%)

(a)

(b)

(c)