0.05 0.07 0.1 0.2 0.3 0.4 0.5 0.6 0.8 1 1

2 3 4 5 6 8 10

20

Albedo

R(θv=82.5 °,ϕ=0°) θ_o = 84.8°

θ_o = 69.3°

θ_o = 52.8°