045

225

000

180

315

135

270 90

0.8

1

1.2

1.4

1.6

1.8

2

045

225

000

180

315

135

270 90

0.7

0.85

1

2

3

4

045

225

000

180

315

135

270 90

0.9

0.95

1

1.05

1.1

1.15

045

225

000

180

315

135

270 90

1

0.9

1.3

1.6

045

225

000 315

135

270 90

0.8

0.9

1

2

3

4

θ_o=52.8° λ =600 nm θ_o=52.8° λ =1800 nm

θ_o=69.3° λ =600 nm

θ_o=84.8° λ =600 nm θ_o=69.3° λ =1800 nm