Wavelength (nm)

0.01

0.02

0.03

0.04

0.05

55 60 65 70 400

500

600

700

800

900

Solar Zenith Angle

0.01

0.02

0.03

0.04

0.05

55 60 65 70 400

500

600

700

800

900

Coefficients for measured patterns

Parameterized coefficients