0.5 1 1.5 2 2.5 3 3.5 4 -80 -60 -40 -20 0 20 40 60 80

-4 -4 -4 -4 -2 -2

-2

-2 -2 -2 -2

-2

-2 -2 -2

-2 -2 -2 -2

-2

-2 -1

-1

-1

-1

-1

-1

-1

-1

-1

-1

-1

-1

-1 -1 -1

-1

-1

-1

-1 1

1

1

1

1

1

1

1

2 2

2 2

2 2

2 2

2

4 4 4 4 6 6 6 6

Zonal average annual cycle of SST