-4

0

4 cccma cgcm3 1

eSW=0.16 eLW=0.058 -4

0

4 cnrm cm3

eSW=0.081 eLW=0.063 -4

0

4 csiro mk3 0

eSW=0.37 eLW=0.63 -4

0

4 csiro mk3 5

eSW=0.44 eLW=0.4

-4

0

4 gfdl cm2 0

eSW=0.23 eLW=0.035 -4

0

4 gfdl cm2 1

eSW=0.2 eLW=0.32

2020 -4

0

4 giss model e h

eSW=0.15 eLW=0.19 -4

0

4 giss model e r

eSW=0.066 eLW=0.69

-4

0

4 iap fgoals1 0 g

eSW=0.11 eLW=0.65 -4

0

4 inmcm3 0

eSW=0.18 eLW=0.095 -4

0

4 ipsl cm4

eSW=0.42 eLW=0.42 -4

0

4 miroc3 2 hires

eSW=0.17 eLW=0.22

-4

0

4 miroc3 2 medres

eSW=0.49 eLW=0.68 -4

0

4 miub echo g

eSW=0.23 eLW=0.85

2020 -4

0

4 mpi echam5

eSW=0.2 eLW=0.47 -4

0

4 mri cgcm2 3 2a

eSW=0.1 eLW=0.23

2020 -4

0

4 ncar ccsm3 0

eSW=0.1 eLW=0.092 -4

0

4 ncar pcm1

eSW=0.14 eLW=0.16 -4

0

4 ukmo hadcm3

eSW=0.075 eLW=0.087 -4

0

4 ukmo hadgem1

eSW=0.22 eLW=0.097