GCM feedbacks Ens mean LW Ens mean SW Ens mean LW+SW 0 0.5 1 1.5 2 2.5 3

Mean absolute error

SW curve error, models sorted by rs

0.5 1 1.5 2 2.5 3 LW curve error, models sorted by rs