-60 -40 -20 0 20 40 60 80 100

2.4 6 12 24 50 NH Obs.

SH Obs.

Days past the summer solstice

Mixed Layer Depth (meters)

Seasonal Phasing of energy fluxes and temperature as a function of mixed layer depth