-1 -0.5 0 0.5 1 1.5

2.4

6

12

24

50

NH Obs.

SH Obs.

Seasonal amplitude of enrgy flux in phase with total heating

Mixed Layer Depth (meters)

Seasonal Amplitude of energy fluxes and normalized by magnitude of total heating

SWABS Surface Heating Column Tendency OLR Heat Transport div.